/*
 Navicat Premium Data Transfer

 Source Server         : imagedb(本地)
 Source Server Type    : Oracle
 Source Server Version : 110200
 Source Host           : localhost:1521
 Source Schema         : IMAGEDB

 Target Server Type    : Oracle
 Target Server Version : 110200
 File Encoding         : 65001

 Date: 02/12/2022 09:38:20
*/


-- ----------------------------
-- Table structure for CHANGERECORD
-- ----------------------------
DROP TABLE "IMAGEDB"."CHANGERECORD";
CREATE TABLE "IMAGEDB"."CHANGERECORD" (
  "UUID" VARCHAR2(255 BYTE) NOT NULL,
  "MODIFYTIME" DATE,
  "EXPLAINTEXT" VARCHAR2(255 BYTE)
)
TABLESPACE "USERS"
LOGGING
NOCOMPRESS
PCTFREE 10
INITRANS 1
STORAGE (
  INITIAL 65536 
  NEXT 1048576 
  MINEXTENTS 1
  MAXEXTENTS 2147483645
  BUFFER_POOL DEFAULT
)
PARALLEL 1
NOCACHE
DISABLE ROW MOVEMENT
;

-- ----------------------------
-- Primary Key structure for table CHANGERECORD
-- ----------------------------
ALTER TABLE "IMAGEDB"."CHANGERECORD" ADD CONSTRAINT "PK__ChangeRe__7F427930511FB049" PRIMARY KEY ("UUID");

-- ----------------------------
-- Checks structure for table CHANGERECORD
-- ----------------------------
ALTER TABLE "IMAGEDB"."CHANGERECORD" ADD CONSTRAINT "SYS_C0015740" CHECK ("UUID" IS NOT NULL) NOT DEFERRABLE INITIALLY IMMEDIATE NORELY VALIDATE;
