/*
 Navicat Premium Data Transfer

 Source Server         : Mysql(本地)
 Source Server Type    : MySQL
 Source Server Version : 50729
 Source Host           : localhost:3305
 Source Schema         : imagedb

 Target Server Type    : MySQL
 Target Server Version : 50729
 File Encoding         : 65001

 Date: 02/12/2022 09:40:10
*/

SET NAMES utf8mb4;
SET FOREIGN_KEY_CHECKS = 0;

-- ----------------------------
-- Table structure for changerecord
-- ----------------------------
DROP TABLE IF EXISTS `changerecord`;
CREATE TABLE `changerecord`  (
  `uuid` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_bin NOT NULL,
  `modifytime` datetime(0) NULL DEFAULT NULL,
  `explaintext` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_bin NULL DEFAULT NULL,
  PRIMARY KEY (`uuid`) USING BTREE
) ENGINE = InnoDB CHARACTER SET = utf8mb4 COLLATE = utf8mb4_bin ROW_FORMAT = Dynamic;

SET FOREIGN_KEY_CHECKS = 1;
